<template>
  <div>
    <NuxtPage />
    <NuxtLink to="/">index</NuxtLink>
    <NuxtLink to="/about">about</NuxtLink>
  </div>
</template>


<style>
/* You can customise the default animation here. */

::view-transition-old(root) {
  animation: 90ms cubic-bezier(0.4, 0, 1, 1) both fade-out;
}

::view-transition-new(root) {
  animation: 210ms cubic-bezier(0, 0, 0.2, 1) 90ms both fade-in;
}
</style>
